en	Ill

en	Texte

en	title

en	slug

en	Content

en	Publication date

en	Thumbnail

en	Image display in list of item

en	Highlithed image

en	Image displayed at the top of the news.

en	Internal tags

en	News

en	News

en	Start at

en	End at

en	Tags

en	Event

en	Events

en	Text

en	file

en	Main content

en	Page list of the instruments. It should be only one of this type!

en	Page linked to an instrument.

en	Extra page added to the instrument, accessible through the 'More' tab

en	News list page. There should be only one of it!

en	Event list page. There should be only one of it!

en	Generic page content.

en	Image featured in the main menu

en	This image is use only if the page is at the root of the site.

en	reverse ID

en	ID pour récupérer l'URL de la page

en	Page that redirect to something else.

en	Redirection

en	Redirections

en	Bad request

en	Error

en	Your browser sent a request that this server could not understand.

en	Go to the home page

en	Forbidden access

en	you do not have enough privilege to view this page.

en	Page not found

en	the requested page does not exists.

en	Ouch, something's wrong

en	An error occurred on the server. An email was automatically sent to us to report it. However, if this error occurs repeatedly over a long period, do not hesitate to contact the site administrators.

en	500 on %(SITE_NAME)s

en	Send an email to the technical team

en	Contact the technical team

en	Website maintenance or overloading

en	Service unavailable

en	The server is currently unable to handle the request due to a temporary overloading or maintenance of the server.

en	The implication is that this is a temporary condition which will be alleviated after some delay.

en	503 on %(SITE_NAME)s

en	Description

en	Characteristics

en	How it works

en	Software

en	Publications

en	Contacts

en	More

en	close

en	Default display

en	Skip links

en	Go to main content

en	Go to main menu

en	Go to user menu

en	Go to footer

en	Go to home page

en	Logo %(SITE_NAME)s

en	from

en	L'équipe du site

en	Nous suivre

en	Nous suivre sur %(label)s

en	sur %(label)s

en	Highlights

en	%(SITE_NAME)s is currently down for maintenance.

en	We are sorry, %(SITE_NAME)s is temporarily down for site enhancements.

en	Normal service will be restored soon.

en	Your profile has been deactivated

en	%(user_name)s, Your account has been deactivated. If you think this is an error, please contact us.

en	Title

en	Link URL

en	Link text

en	Decorative image

en	It will be croped as a 80x80px image